-- 权重配比测试记录表：保存测试时的权重快照与落点统计，用于验证配比效果
-- weight_config_snapshot: 测试时使用的权重配比快照（按档位 T1-T5/BIGWIN 的 id, grid_number, tier, weight）
-- result_counts: 落点统计 JSON，键为 grid_number（色子点数），值为出现次数
CREATE TABLE IF NOT EXISTS `dice_reward_config_record` (
    `id` int unsigned NOT NULL AUTO_INCREMENT COMMENT '主键',
    `test_count` int unsigned NOT NULL DEFAULT 100 COMMENT '测试次数：100/500/1000',
    `weight_config_snapshot` json DEFAULT NULL COMMENT '测试时权重配比快照：按档位保存 id,grid_number,tier,weight',
    `result_counts` json DEFAULT NULL COMMENT '落点统计：grid_number=>出现次数',
    `admin_id` int unsigned DEFAULT NULL COMMENT '执行测试的管理员ID',
    `create_time` datetime DEFAULT NULL COMMENT '创建时间',
    PRIMARY KEY (`id`),
    KEY `idx_create_time` (`create_time`),
    KEY `idx_admin_id` (`admin_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci COMMENT='奖励配置权重测试记录';
